; comdtest.def : Declares the module parameters for the application.

NAME         ANEWTEST
; use an 'A' at the start of the name to get it to the top of HeapWalk's display
DESCRIPTION  'NEWTEST Windows Application'
EXETYPE      WINDOWS

CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024   ; initial heap size
; Stack size is passed as argument to linker's /STACK option


